; Step3d2LT.def : Declares the module parameters for the DLL.

LIBRARY      "Step3d2LT"
DESCRIPTION  'Step3d2LT Windows Dynamic Link Library'

EXPORTS
  LIBRARYID    @1
  LIBRARYENTRY @2
